---
permalink: health-checker/task-deleting-group-actions.html
sidebar: sidebar
keywords: 
summary: 'You can delete a group action from Unified Manager when the group action is no longer required.'
---
= Deleting group actions
:icons: font
:imagesdir: ../media/

[.lead]
You can delete a group action from Unified Manager when the group action is no longer required.

== Before you begin

You must have the Application Administrator or Storage Administrator role.

== About this task

When you delete the group action for the volume health threshold, global thresholds are applied to the storage objects in that group. Any object-level health thresholds that are set on the storage object are not impacted.

== Steps

. In the left navigation pane, click *Storage Management* > *Groups*.
. In the *Group Actions* tab, select the group action that you want to delete, and then click *Delete*.
. In the *Warning* dialog box, confirm the deletion by clicking *Yes*.
